Title: Basalganglien Anatomie

- Thalamus
- Nucleus Caudatus (NC)
- Putamen (PN)
- Globus pallidus pars interna (Gpi)
- Globus pallidus pars externa (Gpe)
- subthalamischer Nucleus (STN)
- Substantia Nigra (SN)
Q: T
A: Thalamus
Q: NC
A: Nucleus Caudatus (NC)
Q: PN
A: Putamen (PN)
Q: Gpi
A: Globus pallidus pars interna (Gpi)
Q: Gpe
A: Globus pallidus pars externa (Gpe)
Q: STN
A: subthalamischer Nucleus (STN)
Q: SN
A: Substantia Nigra (SN)