Title: The size of an atom

Q: From above microscopy images, the approximate size of an atom is...
- 1 Angstrom = 0.1 nm = E-10 m (correct)
- 1 nm = E-9 m
- 10 nm = E-8 m
- 0.1 Angstrom = 0.01 nm = E-11 m